The Martian UpperAtmosphere as Revealedby Mars GlobalSurveyor�s AerobrakingPaul Withers & SteveBougherLPLC II19 May 1999

Data and Predictions¥Density, density scale height &temperature at 130 km (in &out) and periapsis (100-110 km)¥Mars Thermosphere GlobalCirculation Model predictsmean atmospheric behaviour¥Predictions cover ~ 1 month

Points to remember¥Unexpected stationarylongitudinal variations meansurface effects propagating upover 100km¥Mid-latitude models useful¥Polar night badly modelled